         180           8
 -0.100178578200673      -0.669210605382211       -1.31190674567773     
  -1.93516924687470       -2.54351365767294       -3.13458014721825     
  -3.68169072075731       -4.21541119921479     
  -11.5595754629602       -11.6160758237970       -11.7306751170344     
  -11.8846470953109       -12.1680596199701       -12.5599666070616     
  -12.8127058268536       -13.0922930387218     
  3.047476970075692E-004  0.000000000000000E+000
  0.993163082038966       0.000000000000000E+000
  0.995953859252175       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
