         180           3
   7.91183012483526        5.80262000694415        3.68814514311181     
   16.3102318886886        16.5627679536903        17.0306510953417     
 -5.576851076000111E-004  0.000000000000000E+000
   1.00190540000301       0.000000000000000E+000
  0.998905982140154       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
