         180           8
 -0.100636248543788      -0.691805164080697       -1.35543713417785     
  -2.01108225904381       -2.60211549295062       -3.19370459182863     
  -3.81104693932301       -4.27192091778140     
  -11.2901269401631       -11.3563972007026       -11.5181532164078     
  -11.7036518237694       -12.0070796664671       -12.3772520881534     
  -12.6500248127971       -12.9072185586838     
  2.703113945679761E-004  0.000000000000000E+000
  0.993345812444239       0.000000000000000E+000
  0.996016693316152       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
