         180           8
 -9.694292424453285E-002 -0.745075538159926       -1.37179447149019     
  -2.01122558298861       -2.61503506317914       -3.20578512241305     
  -3.78518859091104       -4.23946773011959     
  -10.8417022346992       -10.9631779282235       -11.0833691535980     
  -11.3535289522973       -11.6598459116147       -11.9414769591990     
  -12.2834194879430       -12.6655233582882     
  2.432133198641016E-004  0.000000000000000E+000
  0.993394414752907       0.000000000000000E+000
  0.996106237049686       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
