         180           8
 -4.203411593216450E-002 -0.670420828328506       -1.28786044309136     
  -1.92046452211124       -2.61354732996194       -3.25907546231460     
  -3.83177665758909       -4.26446433230983     
  -10.7121826022186       -10.5285431179680       -10.7659120586788     
  -11.0540328743464       -11.3581819684045       -11.7097704818285     
  -12.0574200605810       -12.4201906306435     
  1.912463583078355E-004  0.000000000000000E+000
  0.993546050347243       0.000000000000000E+000
  0.996197507874504       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
