         180           8
 -0.873889685399105       -1.49603416378280       -2.13710107257177     
  -2.76586380401669       -3.36535035612242       -3.92274893232866     
  -4.50985165780031       -4.99340009415391     
  -10.7831633713189       -10.8711994671149       -10.9662062825284     
  -11.1145421995377       -11.3608813586991       -11.7090777095376     
  -12.0124243388412       -12.1582977645224     
  6.791335744177169E-004  0.000000000000000E+000
  0.992650357040423       0.000000000000000E+000
  0.995330275165053       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
