         180           8
 -0.691230065519933       -1.40104251143457       -2.06515455197472     
  -2.73523298339940       -3.34382473609979       -3.90977383480989     
  -4.47005181128641       -4.94112357108156     
  -10.7536157597799       -10.8689657085940       -11.0785562727227     
  -11.2747855733141       -11.5327727150776       -11.8593887678422     
  -12.1506936398451       -12.4472540522654     
  5.880348363771406E-004  0.000000000000000E+000
  0.992705977397948       0.000000000000000E+000
  0.995304359575794       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
