         180           3
   8.15157072578589        6.11531237931011        4.03092788975890     
   17.0845266783330        17.5873170831178        17.9911183309448     
 -5.853676626871543E-004  0.000000000000000E+000
   1.00171564880292       0.000000000000000E+000
  0.998480542417052       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
