         180           8
 -0.749142616148241       -1.25144254839835       -1.92671195606375     
  -2.57049014748793       -3.18373681174477       -3.75020185117020     
  -4.31545072597195       -4.79670931052068     
  -10.6106956438679       -10.6928873750910       -10.8715248214822     
  -11.0278243105258       -11.2407467379621       -11.6363420765838     
  -12.0590181182884       -12.3034668842521     
  4.599014336734510E-004  0.000000000000000E+000
  0.992990871513107       0.000000000000000E+000
  0.995522617559543       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
