         180           3
   8.02572016706307        6.02118863009838        3.80990556785166     
   16.7855694553854        17.5246327492628        18.0119816362826     
 -7.185218403364173E-004  0.000000000000000E+000
   1.00186249628627       0.000000000000000E+000
  0.998418902773737       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
