         180           8
 -0.321811459903150       -1.16268870264917       -1.71454161869881     
  -2.31659093656279       -2.94216371636184       -3.48927269419225     
  -4.00832737583494       -4.63050104000178     
  -11.1902528349568       -11.2625116527696       -11.2432172726543     
  -11.3444463769033       -11.5329578894940       -11.8118631705598     
  -12.1031753429906       -12.2694436346265     
  3.229676497918111E-004  0.000000000000000E+000
  0.993058146582183       0.000000000000000E+000
  0.995466162554714       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
