         180           8
 -0.332748417160414       -1.02796056234216       -1.63218632345888     
  -2.27852114320761       -2.93159425481463       -3.52353620659673     
  -4.05464355752142       -4.68832778668984     
  -11.2410652848492       -11.1937336616999       -11.3120060941777     
  -11.4261646622380       -11.6782570189438       -11.9711182704506     
  -12.2019262589836       -12.5136688101737     
  3.081295081760506E-004  0.000000000000000E+000
  0.993206030573706       0.000000000000000E+000
  0.995582408637234       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
