         180           8
 -0.817220163642610       -1.48833739686240       -2.11198998598592     
  -2.78053521416920       -3.39591342001529       -3.90344181565766     
  -4.44916438517746       -4.94164433628325     
  -10.8997047036677       -10.9699891540878       -11.1257632616554     
  -11.3623741154261       -11.6374801148944       -11.9513022836378     
  -12.2495741942658       -12.3586728092511     
  6.833253712345872E-004  0.000000000000000E+000
  0.992341886342050       0.000000000000000E+000
  0.995115305108055       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
