         180           3
   8.30245272166129        6.24904311150002        4.27240041727725     
   16.5200536770388        16.6542907585326        17.5024742196103     
 -6.452379347405573E-004  0.000000000000000E+000
   1.00172577084730       0.000000000000000E+000
  0.998317188574354       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
