         180           8
 -0.726669942597555       -1.38109196792658       -2.06704849590833     
  -2.72588609083143       -3.34876209920754       -3.92615490343648     
  -4.50161912785462       -4.94599444328608     
  -11.3524245915581       -11.4816331107796       -11.7443664596447     
  -11.9799185478207       -12.1988911148769       -12.4308080194972     
  -12.6243603565856       -12.7962123346960     
  5.679987341546491E-004  0.000000000000000E+000
  0.992650140595026       0.000000000000000E+000
  0.995378102713413       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
