         180           8
 -0.359136487746764       -1.11055911850846       -1.78009528515951     
  -2.43375008659414       -3.07042823413455       -3.68480285073046     
  -4.23864748250020       -4.82193142590832     
  -12.1126878360507       -12.2632713293402       -12.4149372690392     
  -12.5094068957937       -12.6303261480112       -12.8261070214128     
  -13.0707718115628       -13.4204507478421     
  3.618605350118032E-004  0.000000000000000E+000
  0.992956708429750       0.000000000000000E+000
  0.995496130630124       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
