         180           3
   7.68741117400666        5.68517527898466        3.68155618027612     
   15.6462506677864        16.1701076163826        16.8198150195383     
 -6.765725235864929E-004  0.000000000000000E+000
   1.00170554864244       0.000000000000000E+000
  0.998538314170405       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
