         180           8
 -0.317018915837568      -0.865788671828905       -1.53544170609373     
  -2.19873403016806       -2.81049793267789       -3.38122536227501     
  -3.92774658469149       -4.51318390890916     
  -12.4111978649880       -12.4252190548040       -12.6015819366386     
  -12.8125090545020       -12.9973503570818       -13.2292054716928     
  -13.4639741703459       -13.7178865150060     
  2.877470283009304E-004  0.000000000000000E+000
  0.993041085515877       0.000000000000000E+000
  0.995665114402394       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
