         180           8
 -0.230878058379126      -0.729333483600420       -1.36233523986413     
  -1.98858576398746       -2.57796100340839       -3.13529902566195     
  -3.71367123828610       -4.14585982420913     
  -12.6304281592232       -12.7956260240938       -13.2614607390422     
  -13.4463295267450       -13.6700577970753       -13.9421116180876     
  -14.0936459584528       -14.2343243852604     
  1.109700086139941E-004  0.000000000000000E+000
  0.993296570833479       0.000000000000000E+000
  0.996090074695562       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
