         180           8
 -8.080944912605977E-002 -0.854852411694400       -1.54736888204310     
  -2.18298454135022       -2.76142191082920       -3.27281343197601     
  -3.82030652765255       -4.28481219736979     
  -12.7444591004016       -12.8391509268570       -12.9771480329576     
  -13.1455087202395       -13.3895401133758       -13.6541175228083     
  -13.7876580391525       -13.8854975294029     
  2.964056214354790E-004  0.000000000000000E+000
  0.992953163489336       0.000000000000000E+000
  0.995656977714754       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
