         180           3
   7.83354636643002        5.71486634705840        3.70138350059856     
   15.1994399268708        15.3294755402342        16.1467475116503     
 -6.184729460817457E-004  0.000000000000000E+000
   1.00177096246867       0.000000000000000E+000
  0.998506573456747       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
