         180           8
 -1.897335303598855E-003 -0.638752243483143       -1.32561316808709     
  -1.99151877784392       -2.58427643963182       -3.16871278610735     
  -3.68363258576309       -4.20906024769697     
  -13.0385290570652       -13.2201333470414       -13.4156914758954     
  -13.6081600051834       -13.8223275535530       -14.0835374245985     
  -14.2197434313458       -14.3253839839054     
  2.294118785699374E-004  0.000000000000000E+000
  0.993170341865074       0.000000000000000E+000
  0.995967534857092       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
