         180           8
  0.292013704756611      -0.379786074217271       -1.00321605905060     
  -1.62052003566444       -2.21777445045737       -2.83298970326160     
  -3.36049056060911       -3.97247273191487     
  -13.2269958303448       -13.2988881049881       -13.3638508308496     
  -13.4716078417302       -13.6907187404302       -13.9649532185504     
  -14.2573263616329       -14.6024036547998     
  3.030282189796137E-005  0.000000000000000E+000
  0.993274699821568       0.000000000000000E+000
  0.996107510681252       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
