         180           3
  0.162629220267827       -1.55845772333002       -2.69428156877072     
   15.0809581167357        15.2841389664367        15.4715796635625     
 -6.588547710447139E-004  0.000000000000000E+000
   1.00131968951071       0.000000000000000E+000
  0.998392712667066       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
