         180           8
  -4.32881470694311       -4.63956917923645       -4.96043366947580     
  -5.20959605318905       -5.45998836656221       -5.65138749837473     
  -5.78692132635195       -5.75048058642553     
  -18.1446979424969       -18.3698893942557       -18.5293434496433     
  -18.7455682198267       -19.0196195955983       -19.2397684913817     
  -19.3720981421248       -19.7845347674607     
  1.531803140930953E-004  0.000000000000000E+000
  0.992967908903439       0.000000000000000E+000
  0.996005656564982       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
