         180           8
  -1.77834369548238       -2.24048202217855       -2.57854303413433     
  -2.89519666758034       -3.17962245986916       -3.43947361693205     
  -3.69383957339475       -3.89267464052836     
  -18.6793585768425       -18.9176056347749       -19.1125598575431     
  -19.3223462468771       -19.5374618903187       -19.7573717845253     
  -19.9801910267218       -20.2483421106418     
  2.041290037734800E-004  0.000000000000000E+000
  0.993066366090685       0.000000000000000E+000
  0.996086515323335       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
