         180           3
  0.206372322703131       -1.34344247497264       -2.42543582806259     
   15.5361315951061        15.8356774588675        16.0277621821120     
 -7.189086550196268E-004  0.000000000000000E+000
   1.00129943381991       0.000000000000000E+000
  0.998300495705909       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
