         180           8
  -5.56982816542214       -5.84557949822328       -6.14359444302084     
  -6.40468963436155       -6.58312781032483       -6.72504675702346     
  -6.93037090627730       -7.02445104145383     
  -18.0730426853843       -18.2852355906588       -18.4243572104492     
  -18.5832325260642       -18.8639005229951       -19.1334456441889     
  -19.1955424120925       -19.4151292463865     
  7.609590268718448E-005  0.000000000000000E+000
  0.992842683323196       0.000000000000000E+000
  0.995872532708608       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
