         180           3
 -0.210008752487987       -1.50683941817197       -1.86815971198374     
   15.8950882023861        15.7117348547505        16.0113621498606     
 -8.791051978788407E-004  0.000000000000000E+000
   1.00116868301176       0.000000000000000E+000
  0.998194905724995       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
