         180           8
  -6.45979253689612       -6.75306764051161       -7.01643072438399     
  -7.26971173146888       -7.46932033594118       -7.62059866577004     
  -7.76453484727133       -7.87708185516049     
  -17.9655271383356       -18.2077732834886       -18.4318825222574     
  -18.7474006368513       -18.9911906390831       -19.0721050852493     
  -19.0910146946453       -19.2218906157848     
 -1.593586629340065E-004  0.000000000000000E+000
  0.993296056713853       0.000000000000000E+000
  0.996149553941381       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
