         180           8
  0.179890421621607      -0.542355086888464       -1.11483144488596     
  -1.69697411349226       -2.25514371192693       -2.80317975602215     
  -3.28567632351012       -3.64031461536545     
   12.9425428000160        13.0906986783440        13.2122843543637     
   13.2427447875313        13.2961296935567        13.2979317843023     
   13.2716744887604        13.2780358434455     
 -3.731111349604211E-004  0.000000000000000E+000
   1.00146616706047       0.000000000000000E+000
  0.998592319405120       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
