         180           8
 -0.260726818858746      -0.767614337577876       -1.08070274943981     
  -1.39900661746287       -1.71981908439478       -1.99380389122455     
  -2.23720949799132       -2.38422551182643     
  -18.9197720162486       -19.1023521948298       -19.2935127870368     
  -19.6192677707450       -19.9503046816380       -20.1968389082320     
  -20.4301241452649       -20.7317837474158     
  2.800174856618730E-004  0.000000000000000E+000
  0.992762156780304       0.000000000000000E+000
  0.995963699300460       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
