         180           8
  -2.59010446369410       -2.92337764103812       -3.21376386993905     
  -3.54826257713791       -3.87782277119710       -4.08144011220869     
  -4.25623046635059       -4.35946254234630     
  -15.8929803971599       -15.9232034423520       -15.8439558813189     
  -15.7014383748855       -15.5882888282947       -15.5523464085638     
  -15.3498507926938       -15.2320505041851     
  4.179830722451700E-004  0.000000000000000E+000
  0.992592597478408       0.000000000000000E+000
  0.995651523301622       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
