         180           3
  -1.06104180557076       -2.53606067471783       -2.74829043234870     
   15.7920826836619        15.8789816470131        16.1605179044521     
 -6.730098831896642E-004  0.000000000000000E+000
   1.00130860890462       0.000000000000000E+000
  0.998362427580086       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
