         180           8
  -5.45124124231485       -5.63986429648940       -5.93261578773451     
  -6.19514320125525       -6.37421851316872       -6.56469884615332     
  -6.78696689979339       -6.91148633739048     
  -17.1570659082626       -17.5491249457248       -17.7557500164525     
  -18.0949845044429       -18.3784979904949       -18.4809085926328     
  -18.5098826040945       -18.6693375247425     
  1.306180519478752E-004  0.000000000000000E+000
  0.993049432380712       0.000000000000000E+000
  0.995903919259676       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
