         180           3
  -1.85030545665643       -3.57572085248251       -4.58446268549206     
   14.8109354033635        14.8466316022911        14.8484120112457     
 -3.946046797234318E-004  0.000000000000000E+000
   1.00150493686255       0.000000000000000E+000
  0.998557031829812       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
