         180           3
 -0.489501217035778       -2.36197689066441       -3.42897461401030     
   14.9611357652579        15.2243201560901        15.4947712026616     
 -5.302669863192688E-004  0.000000000000000E+000
   1.00126700499031       0.000000000000000E+000
  0.998161448150686       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
