         180           3
 -0.806717994502956       -2.51719108802541       -3.43651867764613     
   15.5203376811284        15.3751264691409        15.6540396399409     
 -6.921871480265818E-004  0.000000000000000E+000
   1.00127722094957       0.000000000000000E+000
  0.998321504783895       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
