         180           8
  -1.64820975228567       -1.96429194395611       -2.21131008617406     
  -2.44630206502104       -2.57942120840641       -2.71438330812855     
  -2.87158933446185       -2.98268919612924     
  -18.1780105284894       -17.8724866206063       -17.4741732405199     
  -17.0430783985416       -16.5965995120078       -16.1720371592139     
  -15.7463614269194       -15.2966120352652     
  3.459166366271589E-004  0.000000000000000E+000
  0.992683660632335       0.000000000000000E+000
  0.995660906832747       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
