         180           8
  -4.08026095907034       -4.41523881230149       -4.68516511572031     
  -4.96934731583177       -5.24062411365219       -5.40215477758692     
  -5.55161136095672       -5.59098103388140     
  -17.7283900518493       -17.9030830978011       -18.0653262028438     
  -18.2690717822489       -18.5545117917758       -18.7749472826628     
  -18.8981934913558       -18.9887524477283     
  3.275459416116165E-004  0.000000000000000E+000
  0.992798440164521       0.000000000000000E+000
  0.995717921653804       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
