         180           8
  -1.54329727581087       -1.87308258254329       -2.21741384817918     
  -2.51968654836565       -2.83007356140004       -3.03134329921878     
  -3.27850062126898       -3.32689882851002     
  -17.6739073171320       -17.9774330044384       -18.3091655458404     
  -18.6523469850639       -19.0354688633777       -19.3034177121023     
  -19.4536938314057       -19.7868042085247     
  3.754231069479253E-004  0.000000000000000E+000
  0.992961580144670       0.000000000000000E+000
  0.995853910670836       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
