         180           8
  -3.64667524402475       -3.95978195898188       -4.31222655392211     
  -4.63424312708776       -4.89777610355143       -5.07511054672363     
  -5.31292294228794       -5.42093486247085     
  -17.2658007488843       -17.6233782261689       -17.9316622407824     
  -18.2488343308709       -18.6735280917932       -18.9518287629534     
  -19.0583972335029       -19.5812123531824     
  2.199039203720449E-004  0.000000000000000E+000
  0.992908022105656       0.000000000000000E+000
  0.995867297060005       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
