         180           3
  0.844611923159263       -1.02237703802255       -2.43048861559808     
   15.7646592110419        15.7716912409512        15.2200650133808     
 -6.256008340915346E-004  0.000000000000000E+000
   1.00130204958708       0.000000000000000E+000
  0.998150896560287       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
