         180           8
  -2.57724524259709       -2.95501607382150       -3.31654019824946     
  -3.71741911977692       -4.04991520572755       -4.34654880800375     
  -4.63597880678054       -4.85674154613506     
  -17.3101533365986       -17.7839217133397       -18.0810876202670     
  -18.4849926763816       -18.8412420361404       -19.2701935742591     
  -19.9401906310048       -20.2012465569027     
  3.252652675491630E-004  0.000000000000000E+000
  0.992822623976104       0.000000000000000E+000
  0.995771504266766       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
