         180           3
   1.60252885835788      -0.311011863759065       -1.63430860239160     
   14.8336462831051        15.0978801162408        15.2623869462998     
 -6.112128322933980E-004  0.000000000000000E+000
   1.00137300668668       0.000000000000000E+000
  0.998244773109530       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
