         180           8
  -1.60146086087071       -1.99551585291582       -2.30082653515860     
  -2.61096983201851       -2.88658583924728       -3.09944822995873     
  -3.29182017934915       -3.48224638826464     
  -19.1325427057327       -19.3850444812516       -19.6182219434345     
  -19.9020694498202       -20.1553633527808       -20.3459249380112     
  -20.5231727249688       -20.6997181108277     
 -2.835774161862513E-004  0.000000000000000E+000
  0.992575390925621       0.000000000000000E+000
  0.995546521262493       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
