         180           3
   1.08255532122796      -0.714818037073612       -2.00681013070779     
   14.7316927747085        14.9048602064183        14.9488534316252     
 -6.046556897666360E-004  0.000000000000000E+000
   1.00135495054735       0.000000000000000E+000
  0.998221677102942       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
