         180           8
  -1.27712936803379       -1.77800386712755       -2.08613829761064     
  -2.44188797601510       -2.78220506910114       -3.05051127437332     
  -3.30159149777619       -3.48466536379985     
  -19.5421637410754       -19.6387120011310       -19.7867756902107     
  -20.0035487201924       -20.2826282866200       -20.4987109727638     
  -20.7060903794604       -20.9056888381314     
 -3.380256777026154E-004  0.000000000000000E+000
  0.992661755966189       0.000000000000000E+000
  0.995616945102261       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
