         180           8
  -1.62683638231406       -2.06138403571710       -2.39856736339478     
  -2.71444253764658       -2.99138966205514       -3.22160600999892     
  -3.46326032077565       -3.62828510545313     
  -18.9503175792027       -19.4122481876173       -19.6969033327666     
  -19.9629602392522       -20.2607686901109       -20.4942479945553     
  -20.7047397946468       -21.6427313531266     
 -3.807178769158384E-004  0.000000000000000E+000
  0.992824147211977       0.000000000000000E+000
  0.995759255520151       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
