         180           3
   1.73162932896853        3.19904401966657        5.17077582255474     
   14.5402667308742        15.3231783366914        16.2348703136892     
 -4.080957661328555E-004  0.000000000000000E+000
   1.00141969338305       0.000000000000000E+000
  0.998073908420688       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
